LIBRARY RunGate
EXPORTS

CreateRunGate
FreeRunGate
RunGateSetBindAddress
RunGateSetBindPort
RunGateGetIOWorkThreadCount
RunGateSetIOWorkThreadCount
RunGateStartup
RunGateStop
RunGateGetActiveSessionCount
RunGateSetName
RunGateGetSendThreadCount
RunGateSetSendThreadCount
RunGateGetDataProcessType
RunGateSetDataProcessType
RunGateSetDataProcessPrintMsgPacket
RunGateQuerySendThreadInfo
RunGateEnumActiveSessions
RunGateCloseSession
RunGateQueryDataStatics
RunGateResetDataStatics
SetOutputMsgFn
RunGateGetKernalVersion
RunGateSetServerIP
RunGateSetServerPort