<template>
  <section class="AiMonitor">
    <template v-if="type=='cmcc'">
      <iframe v-if="cmccUrl" :src="cmccUrl" allow="autoplay *; microphone *; fullscreen *" allowfullscreen
              allowtransparency allowusermedia frameBorder="no"/>
    </template>
    <hikversion-monitor v-else-if="type=='hik'" :src="src"/>
    <dhVideo v-else-if="type=='dahua'" :src="src"/>
    <slwVideo v-else-if="type=='slw'" :src="src"/>
  </section>
</template>

<script>
import HikversionMonitor from "./hikversionMonitor";
import dhVideo from "./dhVideo";
import slwVideo from "./slwVideo";
import request from "dui/lib/js/request";

export default {
  name: "AiMonitor",
  components: {HikversionMonitor, dhVideo, slwVideo},
  props: {
    /**
     * 视频源
     */
    src: {default: ""},
    /**
     * 组件类型
     * cmcc 中移物联,hik 海康威视
     * @values cmcc,hik
     */
    type: {default: "cmcc"},
  },
  data() {
    return {
      cmccUrl: ""
    }
  },
  methods: {
    getCmccURL() {
      const {did} = this.$attrs
      did && request.post(`/app/appzyvideoequipment/getWebSdkUrl?deviceId=${did}`).then(res => {
        if (res.code == 0) {
          this.cmccUrl = JSON.parse(res.data).url
        }
      }).finally(() => this.cmccUrl = this.cmccUrl || this.src)
    }
  },
  created() {
    this.getCmccURL()
  }
}
</script>

<style lang="scss" scoped>
.AiMonitor {
  width: 100%;
  height: 100%;
  min-width: 100px;
  min-height: 60px;

  iframe {
    width: 100%;
    height: 100%;
  }
}
</style>
